Title: Identify minor external repairs to all equipment and accessories.
Course: Motorsports Technology II (20105-II) > Section: Demonstrating Gas Tungsten Arc Welding (GTAW)

Identification should include minor repairs to GTAW equipment and accessories (e.g., cups, coolant), in accordance with manufacturer recommendations, school policies, and instructor guidelines.

Process/Skill Questions:

- What consumables should be used for what application?
- What can happen if necessary repairs are ignored?