Title: Practice ergonomically correct work methods.
Course: Marine Service Technology I (20111-I) > Section: Ensuring Lab Safety

Practice should reflect compliance with OSHA, state, federal, and worksite ergonomic guidelines, such as those for practicing proper lifting techniques.

Process/Skill Questions:

- What is the meaning of the term ergonomics? Why are ergonomic precautions important in the workplace?
- How can a worker protect himself/herself from injury when lifting or moving objects?
- What are common safe lifting techniques? Why should they be used?
- What ergonomic problems may be associated with working in confined spaces?