Title: Explain the purposes and safe operation of yard equipment.
Course: Marine Service Technology I (20111-I) > Section: Performing Marina Operations and Yard Services

Explanation should include

- oil changer
- come-along
- hydraulic jack
- boat stands
- boat blocking
- hydraulic trailers
- forklifts
- travel lifts.

Process/Skill Questions:

- What is the purpose of a boat stand? When is it used?
- What is the safest and cleanest way to change the oil in an inboard system?
- What certifications are required for forklift operators? How are they acquired?