Title: Practice tool safety.
Course: Marine Service Technology I (20111-I) > Section: Ensuring Lab Safety

Practice should include

- identifying safety concerns when using basic hand tools, power tools, precision tools, and specialty equipment
- identifying components of machinery (e.g., guards, blades, moving parts, start/stop switches)
- identifying standard safety procedures (i.e., classroom/lab practices and manufacturer recommendations)
- observing a demonstration of the safe operation and use of each piece of machinery in the
- identifying tool defects
- notifying the instructor about heavily worn, broken, or malfunctioning tools.

Process/Skill Questions:

- What is the procedure for lockout/tagout?
- What are some safety concerns when using basic hand tools?