Title: Explain basic plumbing practices and maintenance related to marine use, according to ABYC installation standards.
Course: Marine Service Technology I (20111-I) > Section: Understanding Marine Systems

Explanation should include

- plumbing practices for seacocks and installations
- hose types
- pumps
- sanitation.

Process/Skill Questions:

- What is the purpose of a seacock?
- What are the different types of pumps used in a boat? What is the purpose of each?
- What plumbing systems are used on boats that contain a head, shower, and galley sink? How does each of these systems function? What routine maintenance do they require?