Title: Describe the use of standard and metric precision measuring and other specialty tools.
Course: Small Engine Repair (20110-18) > Section: Applying Safety Practices in the Small Engine Lab

Description should include

- identifying measuring and specialty tools encountered in the small engine industry, including, but not limited to
  - micrometers
  - dial indicators
  - torque wrenches
  - ignition testers
  - compression testers
  - precision measuring tools (e.g., feeler gauge, micrometer, dial caliper)
  - telescoping gauges
  - pressure/vacuum testers
  - leak-down testers
  - other specialty tools (e.g., spring compressor, piston ring compressor, piston ring expander, flywheel holders, strap wrenches, flywheel pullers)
- the hazards, precautions, use, and maintenance procedures associated with each tool, in accordance with the manufacturer’s specifications and industry-recommended guidelines.

Process/Skill Questions:

- How does heat affect a micrometer?
- Why are standard and quality tools necessary when repairing small engines?
- What is torque, and why is proper torque important?
- What are unsafe uses of air compressors in the small-engine lab/workshop?
- What is the safest way to hold a part in a vise?
- When is the cleaning tank used?