Title: Inspect the breather.
Course: Small Engine Repair (20110-18) > Section: Servicing the Lubrication System

Inspection should include determining the physical or operational capacity, in accordance with procedures outlined in the owner’s or service manual and following instructor guidelines.

Process/Skill Questions:

- What is the purpose of the breather?
- How does the operation of the breather affect the performance of other engine components?