Title: Explain the principles of engine cooling.
Course: Small Engine Repair (20110-18) > Section: Understanding Principles of Engine Cooling and Servicing Air Filters

Explanation should include a discussion on a properly functioning cooling system and how it protects the engine.

Process/Skill Questions:

- What happens to an engine when the cooling system is not functioning properly?
- What happens to the internal heat an engine produces?