Title: Dry bond a brick wall.
Course: Masonry I (17008-I) > Section: Performing Entry-level Brick Masonry

Dry bonding should include a wall that is dry bonded with 3/8-inch joints, +/- 1/8 inch.

Process/Skill Questions:

- What is bonding?
- Why bond a brick wall?