Title: Lay out a block wall.
Course: Masonry I (17008-I) > Section: Laying Concrete Masonry Units

Laying out consists of using a measuring tape or ruler to bond a wall on 16-inch intervals to establish proper spacing of block.

Process/Skill Questions:

- Why do masons use a level to lay out a block wall?
- How many blocks should be laid out in an 8-foot wall?