Title: Identify block sizes.
Course: Masonry I (17008-I) > Section: Laying Concrete Masonry Units

Identification should include

- 4” block
- 6” block
- 8” block
- 12” block.

Process/Skill Questions:

- How do block types get their names?
- What determines the size of block to use in a given application?