Title: Gauge block walls.
Course: Masonry I (17008-I) > Section: Laying Concrete Masonry Units

Gauging must allow blocks to be laid on 8-inch intervals in height.

Process/Skill Questions:

- At what intervals are standard blocks laid?
- How many courses of block are in the average foundation with a basement?