Title: Present the final project report.
Course: Engineering Explorations I-(21005-36) > Section: Examining the Engineering Design Process

Presentation should include

- statement of the engineering-design problem
- obstacles encountered and solutions found in the process
- graphical representations and visual aids (e.g., diagrams, sketches, photos, videos, models, prototypes)
- solution steps
- results
- evaluation of the solution
- final results based on initial expectations and degree of meeting the requirements of the proposal
- demonstration of the final product.

Process/Skill Questions:

- What are the benefits of incorporating graphical and/or visual representations of one’s solution into one’s presentation?
- What makes a presentation effective and persuasive? How can the quality of one’s presentation affect the acceptance of one’s solution?
- Why is it important to show a demonstration of one’s product?