Title: Create a test plan based on specifications/requirements.
Course: Engineering Explorations I-(21005-36) > Section: Examining the Engineering Design Process

Creation should include

- purpose
- methods
- results.

Process/Skill Questions:

- Why is having a test plan important?
- How does the test plan align with real-life working environment?
- How does one prove specifications/requirements have been met?
- What are measures of success for each test?