Title: (Optional) Cut a stair component.
Course: Building Trades II (17009-II) > Section: CARPENTRY: Constructing and Installing Stairs

Cutting should include the following components and adhering to the code requirement of given dimensions for:

- Stringers
- Risers
- Tread

IRC: Chapter 3, section R311, covers details of code requirements for a set of stairs.

Process/Skill Questions:

- What is the critical tolerance in cutting the stringer?
- How would this tolerance affect the product?