Title: Rough-in water supply for a variety of fixtures.
Course: Building Trades II (17009-II) > Section: PLUMBING: Roughing-in Water Distribution Components

Roughing-in may include

- selecting from a variety of fixtures, including a

  - washing machine
  - lavatory
  - kitchen sink
  - tank-type water closet
  - bathtub and/or shower
  - ice maker
  - hose bib

- following blueprints, manufacturer specifications, and code.

IRC: Chapter 27 covers a wide variety of plumbing fixtures and installation.

Process/Skill Questions:

- How is the proper size piping for each fixture determined?
- What is the location of the stub-out for each fixture?
- What are the consequences of not correctly locating the stub-out?