Title: Identify emergency first-aid procedures.
Course: Building Trades II (17009-II) > Section: CORE CONSTRUCTION SKILLS: Applying Basic Construction Safety Standards (Core Safety)

Identification should include standard first-aid procedures and school policies regarding accidents involving

- bodily fluids
- electrical injuries
- eye injuries
- falls
- burns.

Process/Skill Questions:

- What are the steps that should be followed in an accident?
- Why is knowing CPR an important skill in the construction trades?
- Why is it important to be certified to administer first aid?
- What are the different classifications (i.e., degrees) of electrical burns?