Title: Report personal injury, violations of environmental regulations, and equipment safety violations to the appropriate authority.
Course: Building Trades II (17009-II) > Section: CORE CONSTRUCTION SKILLS: Applying Basic Construction Safety Standards (Core Safety)

Report should include an oral or written statement identifying the violation and the date it was observed and should be given to the instructor, supervisor, or local OSHA inspector(s).

Process/Skill Questions:

- What ethical considerations are involved when reporting coworkers?
- Why is it important to follow reporting procedures?
- What is liability?