Title: Explain developmental disturbances that may occur during tooth development.
Course: Dental Careers I (14054-I) > Section: Describing Dental Anatomy

Explanation should include listing the major disturbances and explaining their causes.

Process/Skill Questions

- What do the prefixes micro and macro mean?
- What does the suffix genesis mean?
- What are supernumerary teeth?
- Which teeth are most likely to appear as supernumerary teeth?