Title: Replace the screen in a door.
Course: Building Management II (16103-II-36) > Section: Performing General Building Maintenance

Replacement should include

- selecting PPE, materials, and tools
- removing the door from the opening (if necessary)
- removing the molding or spline and the old screen
- measuring and cutting a new screen, allowing overlap
- installing and securing the new screen
- cutting excess.

Process/Skill Questions:

- What PPE is required when replacing a screen in a door?
- What is the difference between replacing screen wire in a wood door and replacing screen wire in an aluminum door?
- What are the tools and materials required for replacing the screen wire in an aluminum door? In a wood door?
- What is the significance of overlapping and stretching the screening material?