Title: Install VCT floor covering.
Course: Building Management II (16103-II-36) > Section: Performing General Building Maintenance

Installation should include

- selecting PPE, materials, and tools
- cleaning the floor
- removing the base molding
- patching damaged or low areas
- using a chalk line to find the center
- starting in the center of the room, laying the tile
- gluing the tile, working from the center of the room to the outside.

Process/Skill Questions:

- What PPE, tools, and materials are required for the installation of VCT floor covering?
- What surface correction must be made prior to installing VCT floor covering?