Title: Maintain a safe working environment.
Course: Building Management II (16103-II-36) > Section: Applying Basic Construction Safety Standards (Core Safety)

Maintenance should include regular inspections and should result in identifying potential hazards on a jobsite or in the lab, such as

- unstable or improperly erected scaffolding
- electrical hazards
- jobsite debris
- improperly stored materials
- air quality hazards

and when present, must be remedied by appropriate measures and comply with school and instructor's guidelines.

Process/Skill Questions:

- What are some examples of jobsite hazards?
- Why is it important to use good housekeeping standards on a jobsite?
- Why is it important to store materials and tools in their proper place?