Title: Create PLC programs.
Course: Mechatronics III (13901-III) > Section: Understanding Programmable Logic Controller Systems

Creation should include

- single start/stop with counter
- sequential start/stop with timer
- forward/reverse motor controllers.

Process/Skill Questions:

- How does the PLC understand the sequencing of a program?
- What happens if a timer is not reset?
- What are the advantages of PLC programs?