Title: Assess pneumatic and/or hydraulic components within a mechatronic system.
Course: Mechatronics III (13901-III) > Section: Troubleshooting Fluid-Power Systems

Assessment should include referencing technical documents (e.g., data sheets, circuit diagrams, displacement step diagrams, timing diagrams, function charts, operations manuals, schematics) for pneumatic and hydraulic components within a mechatronic system.

Process/Skill Questions:

- Why are the fluid-power systems important for mechatronic systems?
- What purpose do fluid-power systems serve in mechatronics? How is this helpful?