Title: Trace the flow of information in a control function for a mechatronic system or subsystem.
Course: Mechatronics III (13901-III) > Section: Understanding Programmable Logic Controller Systems

Tracing should include standards in automation technology such as

- channel-to-channel
- fieldbus (fieldbus communication) process
- field net (industrial Ethernet)
- wireless.

Tracing may also include the creation of a schematic and/or narrative to describe the flow of information to/from an equipment operator.

Process/Skill Questions:

- How does information get exchanged within the different components of a mechatronic system?
- How are standards related to communication technologies such as fieldbus and field net similar and different?
- What are the main advantages and disadvantages between wired and wireless information transfer methodologies in mechatronics?