Title: Appraise UAS batteries.
Course: Unmanned Aircraft Systems (20905) > Section: Performing Operations

Appraisal should include

- storage requirements
- inspection for defects
- maintaining a full charge.

Process/Skill Questions:

- Where might one find instructions on charging sUAS batteries?
- What are the differences between a smart and non-smart lithium battery?
- When should one not charge a sUAS battery?
- What battery information should be documented and retained?