Title: Inspect the sUAS for maintenance issues.
Course: Unmanned Aircraft Systems (20905) > Section: Performing Operations

Inspection should include

- cleaning lenses and sensors
- ensuring batteries are free of damage, leaks, or bulges.

Process/Skill Questions:

- What documentation should be kept on system maintenance?
- What is the life cycle for vehicle parts, and are they specified by the manufacturer?