Title: Determine airworthiness.
Course: Unmanned Aircraft Systems (20905) > Section: Examining Loading and Performance Concerns

Determination should include a pre-flight inspection to check

- weight
- balance
- center of gravity
- fatigue.

Process/Skill Questions:

- What could happen if a sensor is added to a UAS without consideration for center of gravity?
- Why is it important to know how much payload the UAS can lift?
- How are UAS propellers tested and balanced?