Title: Troubleshoot electrical systems.
Course: Unmanned Aircraft Systems (20905) > Section: Performing Operations

Troubleshooting should include

- voltmeter use
- smart battery application
- soldering
- coverage of plug-in wire harnesses
- calibration of compass and inertia devices
- battery requirements.

Process/Skill Questions:

- How does one know when the system is not working properly?
- What are the physical signs of a bad battery?
- How should batteries be stored and transported?