Title: Perform scheduled maintenance on a fuel system.
Course: Unmanned Aircraft Systems (20905) > Section: Performing Operations

Performance should include

- using safety equipment
- following safety procedures
- checking for leaks.

Process/Skill Questions:

- What are indications that the fuel system is not working properly?
- What are the hazards of fuel systems that propel sUAS?
- How should fuel be stored during transport?
- What is the method of fueling a combustion-powered UAS?