Title: (Optional) Troubleshoot propulsion/powerplant.
Course: Unmanned Aircraft Systems (20905) > Section: Performing Operations

Troubleshooting should include

- checking battery power cable connections
- assessing equipment or system damage
- examining the glow or spark plug.

Process/Skill Questions:

- What components of the UAS battery should be checked?
- What should one troubleshoot if the power system is not working?