Title: Secure mission supplies.
Course: Unmanned Aircraft Systems (20905) > Section: Performing Operations

Securing should include

- platform sources
- payload sources
- protecting customer data.

Process/Skill Questions:

- What items would be beneficial for sUAS pilots when operating in bright sunlight?
- Why is it important to have an inverter generator instead of a standard generator when powering electronics?
- What spare parts and supplies should be readily available during sUAS missions?