Title: Explain the significance of standard viewing conditions in the graphic imaging industry.
Course: Graphic Imaging Technology I (11154-I) > Section: Understanding Color Theory

Explanation should include that standard viewing conditions should

- allow colors to be viewed the same from one location to another
- include no direct sunlight and no bright light sources
- occur in a viewing booth with light at 5000 Kelvin to perceive color.

Process/Skill Questions:

- What problems could occur if images are not viewed under standard conditions?
- What are the advantages of purchasing a commercial viewing booth?