Title: Outline basic principles of sterile technique.
Course: Radiologic Technology II (14105-II) > Section: Examining Professional Standards for Patient Care

Outline should include how to establish and maintain a sterile field through the use of PPE, preparation of materials, and avoidance of contact with nonsterile items and surfaces.

Process/Skill Questions:

- How is PPE used to ensure sterile environments?
- Why is a sterile field necessary in some instances of medical imaging?
- What could be a consequence of failure to maintain a sterile field?