Title: Identify pediatric immobilization techniques designed to reduce radiation exposure.
Course: Radiologic Technology II (14105-II) > Section: Examining Professional Standards for Patient Care

Identification should include

- Pigg-O-Stat
- papoose
- sheets
- compression bands
- towels
- tape
- sponges.

Process/Skill Questions:

- What is a Pigg-O-Stat? When should it be used?
- How would you immobilize a toddler using the papoose technique?
- What precautions should you take when immobilizing a child for a radiologic procedure?