Title: Draw a reflected ceiling plan (RCP), based on a floor plan.
Course: Architectural Drawing and Design (21103-36) > Section: Producing Illustrations

Drawing should provide information on the location of

- switches
- outlets
- light fixtures
- vents or grills
- sprinklers
- fire alarms
- media components
- material and finish
- height of ceiling to floor.

Process/Skill Questions:

- What is the difference in an RCP and an electrical plan?
- How is an RCP read?
- How are materials shown in a reflected ceiling plan?