Title: Explain how testing standards help verify product quality.
Course: Materials and Processes Technology (13052-36) > Section: Exploring Product Standards

Explanation should include

- defining product requirements
- defining testing methods.

Process/Skill Questions:

- How do testing standards help control the quality of a manufactured product?
- Who determines the product requirements?
- What are some examples of nondestructive tests?
- What is ASTM, and what is its main function?

Teacher Resources:

- ASTM International
- American National Standards Institute (ANSI)