Title: Demonstrate the selection of items for assembly.
Course: Sterile Processing Technician I > Section: Preparing Instruments for Packaging

Demonstration should include

- obtaining count sheets, peel pack list, tray list
- reading and identifying items
- cross-referencing different instruments
- sizing and measuring items
- visually identifying instruments.

Process/Skill Questions:

- How do you read a product number?
- Where do you place count sheets?
- What is a peel pack list?
- Why are count sheets placed with surgical trays?