Title: Identify methods of environmental control of contamination.
Course: Sterile Processing Technician I > Section: Understanding Principles of Asepsis

Identification should include

- air handling systems
- traffic control
- physical barriers
- temperature control
- lack of windows
- humidity control
- surgical attire.

Process/Skill Questions:

- How are the standards for temperature and humidity decided?