Title: Describe the high-level disinfection process.
Course: Sterile Processing Technician I > Section: Documenting Processes and Procedures

Description should include

- safety procedures
- disposal methods
- dilution labeling requirements (e.g., concentration, expiration, end-of-use date)
- technician information
- patient information.

Process/Skill Questions:

- What safety precautions should be used when using high-level disinfection?
- What needs to be recorded after instrumentation has been processed using high-level disinfection?
- What patient information is required?