Title: Comply with relevant safety standards and regulations.
Course: Sterile Processing Technician I > Section: Introducing the Roles and Responsibilities of Sterile Processing Technician

Compliance should include

- reporting unsafe conditions to a supervisor, using a required facility form
- cleaning all department surface areas, racks, shelves, storage cabinets, and areas as scheduled and required by infection prevention and control, the CDC, OSHA, hospital accreditation standards, the Joint Commission, and departmental policy.

Process/Skill Questions:

- What are the various hospital boards of accreditation?