Title: Identify potential electrical hazards during vehicle repair.
Course: Collision Repair Technology II (20117-II) > Section: Practicing Safety

Identification should include

- precautions to be taken while
  - disabling airbags
  - working with computerized features
  - repairing other electrical components
- under-hood procedures
  - safety practices
  - methods of operation
  - hazards (e.g., moving parts; thermal, chemical, and electrical hazards)
  - precautions associated with each hazard, in accordance with instructor guidelines.

Process/Skill Questions:

- Why does the painting and refinishing environment have specific clothing requirements?
- What specific PPE is needed when working with electrical hazards?