Title: Illustrate a public utility.
Course: Construction Technology (17002-36) > Section: Exploring Types of Structures

Illustration should include the structure, components, and conveyance of a given public utility, as well as the systems involved.

Illustration may include

- concept to customer
- schematics
- maps and/or geographic information system (GIS)
- pictures or drawings.

Process/Skill Questions:

- How might GIS be used in relation to a public utility?
- What is the difference between a schematic and pictures or drawings?