Title: Troubleshoot series circuits.
Course: Electricity II (17102-II) > Section: Applying Basic Electrical Theory

Troubleshooting must employ appropriate methods and meters. Problem should conform to common trade problems and be diagnosed according to instructor’s guidelines.

Process/Skill Questions:

- Which tester should be used to test current in a series circuit?
- Where in the series circuit is the meter placed to read total voltage?
- What happens to voltage in a series circuit?