Title: Identify basic components of service entrance equipment.
Course: Electricity II (17102-II) > Section: Exploring Panelboards and Switchboards

Identification should include

- the areas where overcurrent protection devices (OCPDs) may be located in residences
- OCPDs in structural plans and various available equipment
- types of surge protection
- locations and types of service equipment

according to NEC standards and the authority having jurisdiction (AHJ).

Process/Skill Questions:

- What is a multi-family dwelling?
- What is the difference between a service lateral and a service drop?
- What is a subpanel?
- What code articles reference the standard sizes for OCPD?
- What breaker size should be used on a 14 wire?