Title: Demonstrate lifting and carrying techniques.
Course: Electricity II (17102-II) > Section: Applying Basic Construction Safety Standards (Core Safety)

Demonstration involves lifting and carrying materials and equipment based on the principles of

- lifting with legs
- keeping back straight
- holding load close to the body
- getting help, if necessary

in accordance with government regulations and instructor's guidelines.

Process/Skill Questions:

- What are common injuries associated with improper lifting techniques?
- What can one do to prevent injury?
- How does proper positioning affect proper technique?