Title: Perform separation and purification techniques.
Course: Biotechnology Foundations in Technology Education (21999) > Section: Exploring Bioprocessing

Performance should include

- techniques such as filtration, chromatography, and solvent extraction
- use of safety procedures, standard operating procedures, sterilization, and correct disposal of hazardous waste.

Process/Skill Questions:

- What is the purpose of separation and purification in bioprocessing?
- What products are produced through separation and purification techniques?