Title: Describe the basic principles of electricity.
Course: Energy Supply: Sustainability and Efficiency I (20901-I) > Section: Understanding Energy Generation

Description should include

- Ohm’s law
- alternating current (AC) and direct current (DC)
- types of conductors and insulators and their uses
- parallel and series circuits
- magnetism.

Process/Skill Questions:

- What is Ohm’s law?
- How is electricity generated?
- What is the difference between a parallel and series circuit?