Title: Perform calculations using fractions.
Course: Industrial Maintenance Technology I (13203-I) > Section: Performing Mathematical Calculations Related to Measurement

Calculations should include addition, subtraction, multiplication, and division of fractions, particularly when performing measurements and reading blueprints.

Process/Skill Questions:

- What are some examples of situations in which calculations with fractions are necessary?
- Why might it be useful to calculate fractions when reading blueprints?
- How can technology be an aid when calculating fractions?