Title: Demonstrate lifting and carrying techniques.
Course: Industrial Maintenance Technology I (13203-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Demonstration should include lifting and carrying materials and equipment based on the principles of

- lifting with legs
- keeping back straight
- holding load close to the body
- getting help if necessary

completed in accordance with government regulations and instructor guidelines.

Process/Skill Questions:

- What are some common injuries associated with lifting and carrying?
- What are some devices that assist lifting and carrying?