Title: Administer or assist the client with self-administration of oral hygiene products.
Course: Medication Aide (14051-36) > Section: Examining Administration of Prepared Instillations and Treatments

Administration should include knowledge of

- the necessity of providing care of the mouth, teeth, gums, and/or dentures at least twice daily, preferably after each meal
- types of oral hygiene products
  - mouthwash
  - toothpaste
  - dental floss
  - denture cleaning products
- how to use oral hygiene products
  - Read package labels and refer to HCP orders for amounts and frequency.
  - Date and initial multi-use containers when opened.
  - Follow the procedures for providing oral care (e.g., brushing, flossing, denture cleaning).
- potential problems of failing to provide oral care
  - gum disease
  - decreased appetite and weight loss
  - linked to a decreased life span.

Process/Skill Questions:

- When would you not use an alcohol-based mouthwash?
- What are two safety procedures that should be performed when cleaning dentures?