Title: Inspect the battery hold-downs, connections, cables, and cable routing.
Course: Diesel Equipment Technology I (20107-I)

Inspection should include checking and cleaning the battery hold-downs and trays.

ASE 3: V. Electrical/Electronic Systems: B. Battery System (P-1)

Process/Skill Questions:

- What can occur when a battery is loose?
- What condition requires replacement (i.e., missing, broken, corroded, striped threads)?
- Why does battery movement cause wires to loosen?