Title: Inspect the fluid levels.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: General

Inspection should include visually checking the levels and condition of

- fuel
- oil
- diesel exhaust fluid (DEF)
- coolant

and determining the necessary action.

ASE 2: I. Diesel Engines: A. General (P-1)

Process/Skill Questions:

- What should the ratio of water to antifreeze be?
- How does one take an oil or coolant sample?
- Why is it important to identify the type of antifreeze?