Title: Check the power steering pump, mounting, and hoses for leaks, condition, and routing.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Drive Train

Checking should include conducting a visual inspection and using hand tools.

ASE 1: IV. Suspension and Steering: C. Steering Pump and Gear Units (P-1)

Process/Skill Questions:

- When should a hose be replaced?
- What is the best wrench to use on hydraulic fittings?
- Why is it important to use swage fittings on power steering lines?