Title: Inspect the turbo charger cooling systems.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: Servicing the Cooling Systems

Inspection should include

- performing a visual inspection of the water supply line and return line for leaks
- removing and replacing any heat shields that surround the turbocharger
- determining additional needed action.

ASE 3: I. Diesel Engines: F. Air Induction and Exhaust Systems (P-2)

Process/Skill Questions:

- Why do some turbochargers have coolant lines while others do not?
- What happens if the heat shield is damaged?
- How would a smoke machine be used in this instance?