Title: Inspect the A/C compressor and lines for condition and visible leaks.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood HVAC

Inspection should include checking the

- A/C compressor and line routing for interference
- connections for evidence of possible leaks (e.g., oil, dirt residue).

ASE 1: VI. Heating, Ventilation, and Air Conditioning: B. Refrigeration System Components (P-1)

Process/Skill Questions:

- What may cause the A/C systems to leak?
- What is the effect on the environment of a leaking A/C system?