Title: Inspect the fan assembly and shroud.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cooling System

Inspection should include

- checking the fan blades for damage (e.g., bent or broken blades)
- checking the condition and mounting of the fan shroud.

ASE 8: I. Diesel Engines: E. Cooling Systems (P-1)

Process/Skill Questions:

- What effect can broken or bent fan blades have on the operation of the cooling system?
- What are two reasons for having a properly functioning fan shroud?