Title: Inspect the turbocharger, wastegate, and piping systems.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: Servicing the Air Induction and Exhaust Systems

Inspection should include

- performing an operational bench test for wastegate performance
- performing a visual inspection of intake system piping
- determining the needed action.

ASE 1: I. Diesel Engines: F. Air Induction and Exhaust Systems (P-2)

Process/Skill Questions:

- What is the purpose of the wastegate?
- What will the complaint be if the wastegate opens early?
- What will happen if the wastegate never opens?