Title: Test the low voltage disconnect (LVD) systems.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: Servicing the Battery

Testing should include

- inspecting based on manufacturer guidelines
- interpreting the appropriate wiring diagrams
- following manufacturer guidelines for the test.

ASE 6: V. Electric/Electronic Systems: B. Battery System (P-2)

Process/Skill Questions:

- What is the purpose of an LVD system?
- What is the repair procedure for an LVD system?