Title: Adjust the air pressure in accordance with manufacturer guidelines.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Tires and Wheels

Adjustment should include

- checking the air pressure
- recording the air pressure
- adjusting the air pressure to meet manufacturer guidelines.

ASE 1: IV. Suspension and Steering: G. Wheels and Tires (P-1)

Process/Skill Questions:

- How often should tire pressures be checked?
- What problem would tires of unequal dimensions side-by-side cause?
- Where would air pressure specifications be found?
- How is the correct air pressure determined?
- When is the best time to air up tires?