Title: Identify ventilation procedures for working within the lab area.
Course: Diesel Equipment Technology I (20107-I) > Section: Practicing Lab and Personal Safety

Identification should include

- knowing the hazards that are contained in vehicle exhaust
- understanding the effect on the environment
- understanding the hazards that exist for you and those around you.

Process/Skill Questions:

- What procedures must be followed to properly vent exhaust?
- Why is it important to have proper ventilation in the shop?