Title: Inspect the water pump.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cooling System

Inspection should include

- examining the water pump and hose
- clearing the weep hole of debris, if applicable
- replacing as needed.

ASE 6: I. Diesel Engines: E. Cooling Systems (P-1)

Process/Skill Questions:

- How would a water pump be inspected, and how often?
- What is the purpose of a weep hole?
- What safety precautions should be taken when replacing a water pump?
- What are the procedures to replace a water pump?