Title: Identify U.S. standard and metric designation.
Course: Diesel Equipment Technology I (20107-I) > Section: Using Tools and Equipment

Identification should include

- the function and application of each system
- the relationship among measurements, tools, and systems used.

ASE 2: Foundational Tasks: Tools and Equipment

Process/Skill Questions:

- Why is it important not to mix the systems?
- What determines the measurement system to be used?
- How are fractions converted to decimals, and why would one want/need to make these conversions?