Title: Inspect the coolant recovery system.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cooling System

Inspection should include

- checking the coolant recovery tank for any leaks
- cleaning the recovery tank if sediment is found
- checking the condition of the hose between the tank and the radiator.

ASE 7: I. Diesel Engines: E. Cooling Systems (P-1)

Process/Skill Questions:

- What is the purpose of the coolant recovery tank?
- What causes the coolant to flow into the tank?
- What causes the coolant to flow from the tank back into the radiator?