Title: Inspect the wheels for cracks, damage, and proper hand-hole alignment.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Tires and Wheels

Inspection should

- follow the procedure written by the manufacturer for inspecting wheels for cracks and damage
- examine for 180 degrees out for valve stems on dual wheels
- check for cracks radiating from openings.

ASE 2: IV. Suspension and Steering: H. Frame and Coupling Devices (P-1)

Process/Skill Questions:

- Why should a wheel be closely inspected on the inside each time it is removed?
- How should a cracked wheel be repaired or replaced, according to manufacturer guidelines?
- How should a wheel with damage to the bead area be replaced or repaired?