Title: Identify tools and their use in diesel applications.
Course: Diesel Equipment Technology I (20107-I) > Section: Using Tools and Equipment

Identification should include

- the National Institute for Automated Service Excellence (ASE) Education Foundation medium/heavy truck tools and equipment list
- common end wrenches
- socket set components
- wrenches
- screwdrivers
- styles of pliers
- hammers
- punches and chisels
- specialty tools
  - cutting tools (e.g., hack saw, tubing cutter, hand reamer, file)
  - electrical system tools (e.g., volt/ohmmeter, continuity light, remote starter switch)
  - battery tools (e.g., cable puller, terminal and post cleaner, battery lifting or carrying strap)
  - lubrication tools (e.g., transmission funnel, oil filter-removing tool, grease gun)
  - miscellaneous tools (e.g., air nozzles, C-clamp, puller set, pressure gauge, screw extractor)
- fasteners (e.g., tapes, dies, nuts, bolts, studs).

ASE 1: Foundational Tasks: Tools and Equipment

Process/Skill Questions:

- What is the difference between an impact socket and a regular socket?
- Why is it important to regularly inspect tools?
- Why is it crucial to keep tools clean?