Title: Inspect the intake manifold, gaskets, and connections.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: Servicing the Air Induction and Exhaust Systems

Inspection should include

- performing a visual inspection of all lines and connections
- tightening and/or double clamping all connections
- making replacements, as needed.

ASE 3: I. Diesel Engines: F. Air Induction and Exhaust Systems (P-1)

Process/Skill Questions:

- What issues would a defective manifold cause on a naturally aspirated (N/A) engine vs. a turbocharger (T) engine?