Title: Check the clutch adjustment.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Drive Train

Checking should include

- identifying manufacturer guidelines
- determining whether there is free play in the clutch
- checking internal and external adjustments.

ASE 1: II. Drive Train: B. Clutch (P-1)

Process/Skill Questions:

- Why is it important to follow manufacturer guidelines?
- Why should a technician make a thorough inspection of all linkage components before making clutch adjustments?
- What problems might arise after a new clutch installation when several slightly worn linkage components are not replaced?