Title: Drain water and contaminants from the fuel system.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Fuel System

Draining should include following manufacturer guidelines in draining water from the fuel tank (if equipped).

ASE 3: I. Diesel Engines: G. Fuel System (P-1)

Process/Skill Questions:

- What is the source for most water found in diesel fuel?
- What is one source of contaminants in the fuel system?