Title: Check the air induction system for air restrictions and leaks.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Air Induction and Exhaust System

Checking should include

- inspecting piping, charge air cooler, hoses, clamps, and mounting
- inspecting the air filter indicator to determine air filter restriction level
- recording the findings.

ASE 2: I. Diesel Engines: F. Air Induction and Exhaust Systems (P-1)

Process/Skill Questions:

- What do the numbers on the side of the air filter indicator denote?
- Why is it important to record the findings?