Title: Determine the battery’s state of charge and state of health using an open-circuit voltage test.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: Servicing the Battery

Determination should include referencing service materials and following manufacturer guidelines.

ASE 2: V. Electric/Electronic Systems: B. Battery System (P-1)

Process/Skill Questions:

- When should a battery state-of-charge test be performed?
- What type of acid is in a lead-acid battery?
- What types of batteries are available?