Title: Clean the battery cables and connectors.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: Servicing the Battery

Cleaning should include the battery case and terminals and

- replacing cables by using the same or larger gauge than manufacturer guidelines
- replacing connectors, clamps/terminals, and hold-downs.

ASE 3: V. Electric/Electronic Systems: B. Battery System (P-1)

Process/Skill Questions:

- What precautions should be taken when servicing a battery?
- What product(s) can neutralize battery acid?