Title: Check the instruments.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood Instruments and Controls

Checking should include verifying and recording the oil pressure and system voltage on the instrument cluster.

ASE 1: VII. Cab: B. Instruments and Controls (P-1)

Process/Skill Questions:

- What does a low oil pressure indicate?
- What does low voltage indicate?