Title: Inspect EGR system.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Air Induction and Exhaust System

Inspection should include following guidelines for all the EGR components.

ASE 1: I. Diesel Engines: I. Emission Control (P-1)

Process/Skill Questions:

- What is the purpose of the EGR system?
- What issues will a failed EGR system cause?