Title: Inspect the cab mountings, hinges, latches, linkages, and cab ride height.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood Hardware

Inspection should include checking and testing, based on manufacturer guidelines.

ASE 4: VII. Cab: D. Hardware (P-1)

Process/Skill Questions:

- What can occur when the cab mountings, hinges, latches, linkages, and ride height specifications are outside manufacturer guidelines?
- How is ride height checked?
- When a replaced part appears to be substandard, what actions should be taken?