Title: Charge the battery using the appropriate method for battery type.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: Servicing the Battery

Charging should include

- maintaining or restoring the electronic memory functions
- inspecting, cleaning, filling, and replacing the battery
- performing slow and fast battery charge
- following charging procedures for the type of battery.

ASE 4: V. Electric/Electronic Systems: B. Battery System (P-1)

Process/Skill Questions:

- Why is slow charging preferred?
- How would an absorbed glass mat (AGM) battery be charged?
- What gas is produced when charging a battery?