Title: Inspect the brake lines, fittings, flexible hoses, and valves for leaks and damage.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing Hydraulic Brakes

Inspection should include

- checking for cracks and wear points and proper clearance to prevent contact and wear points
- checking connections’ tightness and for leaks.

ASE 2: III. Brakes: E. Hydraulic Brakes: Hydraulic System (P-1)

Process/Skill Questions:

- What may happen when the brake lines come loose or leak?
- What may occur when the brake lines rub against other components?