Title: Inspect the mirrors, mountings, brackets, and glass.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood Hardware

Inspection should include

- checking the mirrors, mountings, and brackets for broken or looseness in the mounting
- checking the mirror glass for cracks or discoloration
- moving the mirrors to all their available positions and checking for proper operation and visibility.

ASE 1: VII. Cab: D. Hardware (P-1)

Process/Skill Questions:

- How would one determine when the mirrors are in good working condition?
- How would one determine when the mirrors moved through all their positions without binding?