Title: Check the air induction system.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: Servicing the Air Induction and Exhaust Systems

Checking should address piping, hoses, clamps, and mounting, and should include

- using the scan tool and comparing results to service materials and manufacturer guidelines
- using the air filter indicator to determine filter replacement needs
- changing an air filter, as required
- determining the needed action.

ASE 2: I. Diesel Engines: F. Air Induction and Exhaust Systems (P-1)

Process/Skill Questions:

- What problems can unfiltered air cause?
- What complaint might an air leak after the turbocharger cause?
- What are the causes of a clogged air filter?
- What are considerations when changing an air filter?
- How would a smoke machine be used in this instance?