Title: Check the current flow in electrical/electronic circuits and components using appropriate test equipment.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: General Electrical Systems

Checking should include using the DMM as an ammeter.

Checking should demonstrate an applied understanding of amperage principles and amperage measurement in a circuit.

ASE 3: V. Electric/Electronic Systems: A. General (P-1)

Process/Skill Questions:

- How should an ammeter be connected?
- What is the maximum amperage on most handheld DMMs? What does this mean?