Title: Demonstrate the use of electrical testing equipment.
Course: Manufacturing Systems II, Advanced (13002-II) > Section: Introducing Mechatronics

Demonstration may include

- multimeter
- oscilloscope
- power supplies
- amp clamp.

Process/Skill Questions:

- What does a multimeter measure?
- What does an oscilloscope measure?
- Why are power supplies used?