Title: Test the HVAC system electrical control panel assemblies.
Course: Diesel Equipment Technology III (20107-III) > Section: HVAC: Servicing the Electrical Operating Systems and Related Controls

Testing should include the

- inspection of controls
- determination of binding or sticking.

ASE 2: VII. Cab: A. General (P-1)

Process/Skill Questions:

- What occurs when there is a short with the control head on the mode function knob?
- What is the first action to be taken when there is an issue with any control panel?