Title: Verify the power line carrier (PLC) operations.
Course: Diesel Equipment Technology III (20107-III) > Section: Brakes: Servicing the Air and Hydraulic Antilock Brake Systems (ABS) and Automatic Traction Control (ATC)

Verification should include using a DMM following manufacturer-recommended testing procedures.

Process/Skill Questions:

- What type of test equipment is necessary to verify proper operation of the PLC?
- What trailer light cord circuit does the power line carrier utilize?