Title: Inspect the operation of automatic transmission electronic or air shift selectors, switches, displays, indicators, and wiring harnesses.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Transmission

Inspection should include

- referencing the OEM instructions for troubleshooting steps
- inspecting the shifter for proper operation and lighting according to the OEM
- verifying that all harnesses are in good condition as part of the inspection.

Process/Skill Questions:

- What would a flashing electronic shifter indicate?
- What would a blank shifter indicate?