Title: Inspect the radiator, pressure cap, and coolant recovery system (surge tank).
Course: Diesel Equipment Technology III (20107-III) > Section: HVAC: Servicing the Heating and Engine Cooling Systems

Inspection should include

•    a visual inspection of the system
•    pressure testing of the system to identify leaks.

ASE 7: I. Diesel Engines E. Cooling Systems (P-1)

Process/Skill Questions:

- Where is the correct pressure found to test the cooling system on a vehicle?
- When is the coolant cap pressure tested?
- What is the purpose of the surge tank