Title: (Optional) Store the refrigerant.
Course: Diesel Equipment Technology III (20107-III) > Section: HVAC: Handling the Refrigerant (EPA 609 required)

Storage should include

- following U.S. Environmental Protection Agency (EPA) guidelines to ensure the refrigerant container is inspected and approved before use
- identifying a location where cylinders can be stored upright and in an area without combustible materials.

ASE 1: VI. Heating, Ventilation, and Air Conditioning; E. Refrigerant Recovery, Recycling, and Handling

Process/Skill Questions:

- What is the maximum temperature the refrigerant should be stored?
- Which recovery process is slower: vapor or liquid recovery?