Title: (Optional) Test the recycled refrigerant for non-condensable gases.
Course: Diesel Equipment Technology III (20107-III) > Section: HVAC: Handling the Refrigerant (EPA 609 required)

Testing should include the use of tools for refrigerant identification.

ASE 1: VI. Heating, Ventilation, and Air Conditioning; E. Refrigerant Recovery, Recycling, and Handling.

Process/Skill Questions:

- Where should the refrigerant identifier be connected to test a sample?
- How should recycled refrigerant be stored?