Title: Inspect the water pump.
Course: Diesel Equipment Technology III (20107-III) > Section: HVAC: Servicing the Heating and Engine Cooling Systems

Inspection should include

- pressure testing the coolant system
- confirming conditioning protection levels
- visually examining the water pump.

ASE 6: I. Diesel Engines E. Cooling Systems (P-1)

Process/Skill Questions:

- What is the difference between a weep and a leak on a water pump?
- What will occur if the water pump fails to move water through the system?