Title: Demonstrate electric filing techniques.
Course: Nail Technician II (19105-II) > Section: Providing Advanced Nail Salon Services

Demonstration should include

- understanding the RPM, power, and torque of the electric file and how they affect the procedure
- identifying the uses and benefits of different electric file bits
- maintaining the equipment
- disinfecting drill bits
- filing acrylic product to achieve the desired result for the client’s needs
- understanding application pressure and angle of the file.

Process/Skill Questions:

- What happens if a nail technician improperly uses the e-file?
- How can a technician avoid the rings of fire while using the electric drills?
- What cautions should be taken before operating an electric file on a client?