Title: Describe the responsibilities of a team leader.
Course: Firefighting II (15152-II) > Section: Implementing Incident Command System (ICS)

Description should include

- assembling a team of firefighters for various duties on the fire grounds
- evaluating and forecasting a fire’s growth and development
- planning a fire attack for different levels (e.g., attic, basement) of fire location
- facilitating search and rescue of victims in a structure
- ensuring ventilation of a structure as required by command.

Process/Skill Questions:

- What are the duties as a team leader in fire attack? Search and rescue? Ventilation?
- How should one change the fire attack depending on the level of fire location?