Title: Demonstrate the use, care, and maintenance of power sources, lighting equipment, and auxiliary electrical equipment.
Course: Firefighting II (15152-II) > Section: Working with Rescue and Extrication Tools

Demonstration should include procedures for tools and devices such as

- inverters
- battery-operated equipment
- generators, portable or vehicle-mounted
- lighting equipment, portable and fixed
- electrical cables
- extension cords
- twist-lock adapters/receptacles
- junction boxes.

Process/Skill Questions:

- Why are power and electrical safety issues important during a fire incident?
- What types of lighting are commonly used to support emergency operations?
- What is the purpose of a junction box?