Title: Complete a basic incident report.
Course: Firefighting II (15152-II) > Section: Completing Radio Communications and Incident Reports

Completion should include forms, guidelines, coding procedures, and all pertinent information.

Process/Skill Questions:

- How can incident reports aid in preventing future losses from fires?
- Who is responsible for creating and filing the incident report?
- What sources can aid in the completion of incident reports?
- What are the consequences of filing an inaccurate report?