Title: Inspect course-specific hand and power tools to visually identify defects.
Course: Cabinetmaking I (17007-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Inspection of hand tools should include identification of tool defects.

Inspection of power tools should include

- identifying components of machinery (e.g., guards, blades, moving parts, start/stop switches, cords)
- identifying standard safety procedures (i.e., shop practices, manufacturer recommendations)
- observing a demonstration of the safe operation and use of each piece of machinery in the shop.

Process/Skill Questions:

- What are some of the basic power tools used in construction?
- What actions should be taken before using a power saw?
- Why should a power tool always be grounded?