Title: Explain safe working practices around electrical hazards.
Course: Cabinetmaking I (17007-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Explanation should include

- identifying equipment used to test electrical circuits
- describing safe working conditions
- demonstrating safe work habits

according to industry standards and instructor guidelines.

Process/Skill Questions:

- What is the definition of proximity work?
- What are safe working clearances, according to the National Electric Code (NEC)?
- What are some examples of safe working conditions and safe working habits?
- What is the unseen hazard with electrical work?