Title: Operate a video playback device in a live or "as-live" production.
Course: Television and Media Production II (11103-II) > Section: Production: Mastering Control Room Equipment

Operation should include

- checking the order and sequence of all sources
- following director commands and communicating with crew as needed
- working within time constraints.

Process/Skill Questions:

- What is the importance of following the director’s commands and timeline?
- Why is sequencing important to a video playback operator?
- What are examples of timing constraints or issues?