Title: Select rod type for desired result.
Course: Master Barber III (Three-year Program) (19002-III) > Section: Performing Soft-Curl Permanent

Student should demonstrate a working knowledge of selecting rod size for a soft-curl permanent.

Process/Skill Questions:

- What determines the size of the rod used?
- How many times should the hair encircle the rod?
- Why is it necessary to use a rod at least two times larger than the natural curl?