Title: Explain common preventive-maintenance techniques for laptops and portable devices.
Course: Computer Systems Technology I (10002-I) > Section: Examining Laptops

Explanation should include identifying appropriate cleaning procedures and describing optimal operating environments.

Process/Skill Questions:

- What preventive maintenance should be run on laptops but does not apply to desktops?
- What should be done more often to keep data safe on laptops used in many areas of the country (e.g., office environments, hotspots, airports, homes)? Why?
- What is the best way to clean a laptop display, keyboard, and other exterior parts?