Title: Describe maintenance, cleaning, and inspection functions for salvage and overhaul equipment.
Course: Public Safety II (15101-II) > Section: FIREFIGHTING: Determining Salvage, Overhaul, and Cause of Fire

Description should refer to SOPs/SOGs, manufacturer recommendations, and instructor guidelines.

Process/Skill Questions:

- Where are the methods for maintenance found?
- What is the most recommended method for cleaning?