Title: Maintain safe working practices around production equipment.
Course: Cybersecurity in Manufacturing, Advanced (13002-IV) > Section: Practicing Safety in Manufacturing

Maintenance should include

- identifying potential hazards of each piece of equipment
- demonstrating safe work habits with each type of equipment.

Process/Skill Questions:

- What are the risks of unsafe behavior around production equipment?
- How would safety rules help prevent these risks?
- How does the Occupational Safety and Health Administration (OSHA) affect safety in manufacturing?