Title: Demonstrate accurate documentation.
Course: Patient Care Technician (14051-III) > Section: Understanding Medical Terminology and Documentations

Demonstration should include the use of

- electronic documentation
- electronic downtime forms
- written (i.e., flow sheets) and graph forms
- process of notification and correcting errors in documentation.

Process/Skill Questions:

- Where are vital signs documented?
- What are the guidelines for documenting vital signs?
- How does one correct an error in documentation?