Title: Respond to emergency situations.
Course: Patient Care Technician (14051-III) > Section: Practicing Safety Protocols

Response may include

- active threat/shooter
- fire
- electrical, shock, or radiation hazards
- biological hazard
- chemical hazard
- natural disasters
- violence against healthcare worker.

Process/Skill Questions:

- What do PASS and RACE stand for in fire safety?
- What is a safety data sheet (SDS)?
- Who handles chemical hazards?
- What are the elements of successful emergency action planning?
- What situations are considered internal or external factors?