Title: Operate manual OFC equipment.
Course: Motorsports Technology I (20105-1) > Section: Demonstrating Manual Oxyfuel Gas Cutting (OFC)

Operation should include

- wearing PPE
- adhering to the written or oral welding assignment
- adjusting equipment to obtain a neutral flame
- visually examining cut surfaces
- identifying types of flames
- shutting down equipment at the end of the job.

Process/Skill Questions:

- How are gas cylinders to be stored if not in use for an extended period of time?
- What OSHA regulations pertain to gas cylinder storage?