Title: List PAC safety procedures.
Course: Motorsports Technology I (20105-1) > Section: Demonstrating Plasma Arc Cutting (PAC)

List should include

- never placing body parts under the cutter tip
- turning off power during maintenance
- preparing a clean and safe work area
- making sure there are no flammable objects around the work area
- covering all windows
- being aware of the direction of the sparks
- using PPE
- ensuring good ventilation.

Process/Skill Questions:

- What could happen if body parts were exposed to the arc?
- What would happen to the exposed skin near the arc?
- Why is ventilation so important?
- What could happen to glass when it is exposed to the sparks of the torch?