Title: Perform safety inspections of welding equipment.
Course: Motorsports Technology I (20105-1) > Section: Performing Gas Metal Arc Welding (GMAW, GMAW-S)

Performance should include a daily visual inspection of GMAW and GMAW-S equipment (i.e., welding leads, which include ground and electrode cable) and accessories (e.g., clothing, hand tools, and base metal), according to the instructor's guidelines, and reporting problems to the instructor.

Process/Skill Questions:

- Why is it important to inspect equipment before use?
- Who should perform equipment repair? Why?
- What conditions could keep a worker from welding?