Title: Perform safety inspections of all equipment and accessories.
Course: Motorsports Technology I (20105-1) > Section: Demonstrating Manual Oxyfuel Gas Cutting (OFC)

Performance should include a daily visual inspection of all OFC hoses, cords, and gauges, in accordance with the instructor's or employer's policy.

Process/Skill Questions:

- How should items be inspected?
- What should be done if an item is defective or needs to be replaced?