Title: Set up for manual OFC operations and base metal preparation on carbon steel.
Course: Motorsports Technology I (20105-1) > Section: Demonstrating Manual Oxyfuel Gas Cutting (OFC)

Setup should include

- adhering to written or oral instructions
- wearing PPE
- identifying types of gases
- assembling components (e.g., gauges, hoses, torch, cutting tip)
- completing a leak test.

Process/Skill Questions:

- What are the steps for a leak test?
- What types of gas are used?