Title: Perform straight-cutting operations on carbon steel.
Course: Motorsports Technology I (20105-1) > Section: Demonstrating Manual Oxyfuel Gas Cutting (OFC)

Performance should result in a straight production cut surface to specifications of the written or oral assignment.

Process/Skill Questions:

- How should the cut be performed?