Title: (Optional) Place concrete in forms.
Course: Introduction to Power, Structural, and Technical Systems (18401) > Section: Conducting Concrete and Masonry Practices for Agricultural Structures

Placement may include

- undergoing safety instruction and testing prior to diagnosing, maintaining, repairing, and/or operating power tools, machinery, or equipment
- creating
  - stepping stones
  - mailbox posts

- pouring sidewalks
- following all safety precautions, procedures, guidelines, and manufacturer specifications for working with cement/concrete
- using all required PPE.

Process/Skill Questions:

- Why does concrete need to be vibrated?
- What is the purpose of the concrete form?