Title: Identify safe practices for using keen edge tools and grinding equipment.
Course: Introduction to Power, Structural, and Technical Systems (18401) > Section: Reconditioning Tools

Identification should include instruction and instructor demonstration on the proper use of cutting, turning, chisels, and grinding tools and equipment.

Process/Skill Questions:

- What precautions should be used when using keen edge tools and grinders?
- What PPE should be worn?