Title: Identify safe practices in arc welding.
Course: Introduction to Power, Structural, and Technical Systems (18401) > Section: Performing Metal Fabrication Operations for Agricultural Structures

Identifying safe practices should include

- PPE
- hazards
- all safety guidelines and procedures.

Process/Skill Questions:

- Why should safety glasses be worn along with the welding helmet?
- What is the purpose of a welding helmet?
- What shade lenses should be used for arc welding?
- What is meant by a "flash" in welding?