Title: Use plans and working drawings.
Course: Introduction to Power, Structural, and Technical Systems (18401) > Section: Planning for and Conducting Carpentry Practices for Agricultural Structures

Use may include

- identifying the components of the structure being built
- selecting equipment and supplies for drawing
- drawing views of objects and landscaping plans
- drawing a laboratory project plan
- exploring computer-aided design (CAD) programs
- interpreting electrical, plumbing, and welding symbols.

Process/Skill Questions:

- What views of objects can be drawn?
- What are the steps in drawing an object?
- What is the purpose of a project plan?
- What CAD programs are used in agribusiness?
- What are the advantages of using CAD programs?