Title: Inspect operation of critical systems.
Course: Marine Service Technology II (20111-II) > Section: Maintaining Marine Systems

Inspection should include systems such as

- bilge blower
- bilge pump/float switch
- navigation lights
- horn
- fire suppression
- carbon monoxide detection.

Process/Skill Questions:

- When are navigation lights required?
- What are the minimum visibility ranges for navigation lights?