Title: Perform seasonal maintenance on a gasoline-fueled engine.
Course: Marine Service Technology II (20111-II) > Section: Maintaining and Repairing Inboard, Outboard, and Inboard/Outboard Engine Systems

Performance should include tasks related to

- electrical system
- cooling
- ignition
- fuel
- power trim
- stern drive
- engine controls/rigging
- inboard drive system
- lubrication

according to engine manufacturer instructions and practices and using appropriate testing equipment.

Process/Skill Questions:

- What maintenance is required during the summer months? During storage months?
- Why is seasonal maintenance important, particularly in colder climates?
- What are the steps in winterizing inboard and inboard/outboard engine systems?