Title: Demonstrate installation and termination of wiring.
Course: Marine Service Technology II (20111-II) > Section: Installing, Diagnosing, and Troubleshooting Electrical Systems

Demonstration should include

- crimping
- wire-end termination
- soldering, when appropriate.

Process/Skill Questions:

- What are some safety concerns when dealing with electricity?
- When would you solder a connection?