Title: Troubleshoot DC systems.
Course: Marine Service Technology II (20111-II) > Section: Installing, Diagnosing, and Troubleshooting Electrical Systems

Troubleshooting should include testing for

- corrosion
- damaged or malfunctioning circuits
- voltage drop
- connections
- improper installation
- electrical hazards.

Process/Skill Questions:

- What are common causes of DC system failure?
- What type of corrosion is common in DC systems?