Title: Maintain a clean, safe, and orderly work area.
Course: Television and Media Production III (11103-III) > Section: Practicing Safety on the Set and on Location

Maintenance should include

- unobstructed walkways
- secured cables
- safety harnesses on hanging equipment
- secured staging
- powering down and storing equipment.

Process/Skill Questions:

- Why is it important to maintain a clean lighting grid?
- Why is it important to use safety harnesses on lighting fixtures?
- When is it appropriate to use gloves in the studio?