Title: Dig a clean trench using a backhoe.
Course: Utility/Heavy Construction II (20052-II) > Section: Understanding Trenching

Digging a clean trench should be done according to all laws and regulations, including ensuring that

- the spoil pile is set at a minimum of two feet away from the trench
- the trench is no greater than three feet deep.

Process/Skill Questions:

- Where should one place the spoil pile?
- At what depth is shoring required?
- What can be done to reduce trench depth?