Title: Compare physical security controls.
Course: Cybersecurity Systems Technology, Advanced (10109-IV) > Section: Understanding Network Security

Comparison should include the following:

- Mantraps
- Network closets
- Video monitoring
  - IP cameras/Closed Circuit TVs (CCTVs)

- Door access controls
- Proximity readers/key fob
- Biometrics
- Keypad/cipher locks
- Security guard

Process/Skill Questions:

- What minimum physical security controls should be put in place on a network closet?
- What are some of the different types of biometric controls that can be used to physically control access to network resources?