Title: Maintain patient database.
Course: Medical Administration (14153-36) > Section: Maintaining Electronic Health Records and Files

Maintenance should include entering and updating information, such as

- patient addresses, email addresses, and telephone numbers
- real-time eligibility (RTE)
- insurance information
- demographic information
- patient condition and any medications.