Title: Demonstrate procedures for maintaining and operating office equipment.
Course: Medical Administration (14153-36) > Section: Managing Office Activities

Demonstration should include office equipment such as copiers, printers, scanners, input devices and

- loading paper
- cleaning equipment, including glass surfaces
- clearing paper jams
- changing toner cartridge
- integrating technologies (e.g., copier to email)
- information security and internet network considerations, including encryption
- following correct procedures for turning on, logging in and out, and shutting down the computer (e.g., maintaining secure passwords and logging out whenever leaving the workstation)
- troubleshooting basic problems related to the operation of the computer, according to the manufacturer specification
- handling portable storage devices in a manner consistent with security policies.