Title: Maintain the work environment.
Course: Medical Administration (14153-36) > Section: Managing Office Activities

Maintenance should include

- following protocols for maintaining a productive work environment

- maintaining a clean, neat, and organized work area with necessary supplies and materials
- designing an ergonomically correct work environment

- managing the reception area, adhering to
  - HIPAA
  - Occupational Safety and Health Administration (OSHA)
  - industry best practices.