Title: Maintain patient records.
Course: Medical Administration (14153-36) > Section: Maintaining Electronic Health Records and Files

Maintenance should include

- producing and managing records such as registration forms, medical histories, insurance information, consent forms

- transferring information accurately (e.g., from the paper copy to an electronic file or scanning patient documents)
- assisting patients with form completion (e.g., HIPAA notification)
- demonstrating manual and electronic office skills necessary to complete and file records per company protocol.