Title: Set up a builder’s site level or a rotary laser level.
Course: Masonry III (17008-III) > Section: Performing Additional Masonry Tasks

Setup should include

- stabilizing the tripod
- describing functions of the equipment parts (e.g., telescope, graduated leveling vial, graduated horizontal circle, leveling screws, focusing knob, eyepiece, base)
- adjusting the level
- using the level.

Process/Skill Questions:

- What is the difference between a builder's level and a rotary laser level?
- What precautions should be taken when using a laser level to protect the operator and bystanders from the laser beam?