Title: Inspect metal door and window frames.
Course: Masonry III (17008-III) > Section: Preparing the Building Site

Inspection should include checking for proper alignment with the wall (square and plumb).

Process/Skill Questions:

- How should metal frames be anchored?
- Why is it extremely important that a frame be square and plumb?
- What is the difference between a flush frame and a wrap-around frame?