Title: Identify techniques for rolling, repacking, and deploying hose lines.
Course: Firefighting I (15152-I) > Section: Using Water Supply, Hoses, and Nozzles

Identification should include

- the straight, donut, twin donut, self-locking donut rolls
- the accordion, flat, horseshoe, minuteman, or other load used in the jurisdiction
- forward, split, and reverse hose lays.

Process/Skill Questions:

- Why should the male coupling always be rolled inside?
- Why is it advantageous to place a loop in/near the middle of a cross lay?
- What muscles are used when deploying a hose from an apparatus?
- How can a hose line be extended?
- How should coupling gaskets be replaced?