Title: Set up portable power sources and lighting equipment.
Course: Firefighting I (15152-I) > Section: Understanding Ventilation

Setup should include

- using proper lifting procedures
- inspecting the generator according to manufacturer recommendations
- inspecting all electrical cords
- testing the lighting equipment and replacing light bulbs as needed
- using batteries, battery charging stations, inverters, and other equipment.

Process/Skill Questions:

- When is fuel considered old? Why might using old fuel in a generator be problematic?
- How is the wattage of a replacement light bulb determined?
- How is the generator's oil level checked?