Title: Identify the features of conducting an organized rapid escape.
Course: Firefighting I (15152-I) > Section: Practicing Safety

Identification should include

- pre-planning
- reporting the need
- acknowledging the signal
- leaving behind all equipment
- escaping from a room, roof, or balcony
- using self-rescue techniques
- using a ladder to escape
- reporting a successful escape.

Identification should also include defining what constitutes a safe haven.

Process/Skill Questions:

- What is preplanning?
- What situations would require a rapid escape?
- Why is it important to get a personal accountability report (PAR) after a rapid escape?
- How can one evaluate an area for hazards?
- How does one identify a safe haven?