Title: Identify classroom safety rules and procedures.
Course: Firefighting I (15152-I) > Section: Practicing Safety

Identification should include

- refraining from actions that may result in a preventable accident
- following school safety pledge/code/requirements
- adhering to posted classroom rules.

Process/Skill Questions:

- Why are personal discipline and integrity important to firefighters?
- Why is it important to set a positive example for others?
- What personal characteristics affect education and learning?