Title: Identify fire hazards presented by emerging technologies.
Course: Firefighting I (15152-I) > Section: Practicing Fire-Suppression Techniques

Identification should include technologies such as electric vehicles (EVs), lithium-ion technology, alternative fuels, and solar photovoltaic panels.

Process/Skill Questions:

- How are fires from new technologies different from other fires that one may typically encounter?
- How should a fire department respond to a fire caused by alternative fuels?

Teacher Resources:

- Fire Safety Research Institute
- National Fire Protection Association