Title: Analyze a construction schedule.
Course: Construction Technology (17002-18) > Section: Exploring Construction Processes

Analysis should include evaluating a construction schedule for the following:

- Start and completion date for each of the following phases:
  - Site survey
  - Site plans created (i.e., existing topography, home plans added)
  - Site preparation (e.g., cleaning, demolition, fill/excavation, erosion and sediment control)
  - Site excavation
  - Footings
  - Foundation
  - Utilities installed (underground/overhead)
  - Framing (e.g., windows, walls, doors)
  - Mechanical, electrical, and plumbing (MEP) rough-ins
  - Exterior finishes (e.g., roofing, siding)
  - Interior finishes (e.g., insulation, drywall, painting, trim, cabinets, flooring)
  - Site completion

- Materials, equipment, and lead times
- Resources (e.g., manpower)
- Weather
- Inspections.

Process/Skill Questions:

- What is a construction schedule? Why is it important?
- What contractors are needed from planning to completion?
- What possible complications could occur due to poor scheduling?