Title: Justify all safety rules and procedures associated with construction and laboratory activities.
Course: Construction Technology (17002-18) > Section: Demonstrating Lab Safety

Justification should include

- planning for safety requirements
- using, maintaining, and storing construction tools correctly
- maintaining a clean and well-organized workspace and job site
- wearing safety gear and clothing appropriate to the task
- adhering to state and federal rules regarding safe worksite practices.

Process/Skill Questions:

- What agency sets the national standards for safety on construction sites?
- What are the potential consequences when one fails to follow safety procedures on a job site?
- How often should electrical tools be inspected?
- What are the precautions one should take for ladder safety?