Title: Maintain a clean and orderly work area.
Course: Radio Communications II (11051-II) > Section: Observing Safety Procedures

Maintenance should include

- storing recordings and other media
- filing logs and other documentation required by the Federal Communications Commission (FCC) for efficient retrieval
- compiling and organizing a public, online inspection file.

Process/Skill Questions:

- What types of media need to be stored?
- What FCC documents must be filed?
- How do you create an organized filing system?