Title: Troubleshoot a fluid-power system.
Course: Industrial Robotics Technology (21009) > Section: Understanding Power Systems in Robotics

Troubleshooting should include

- accessing standard troubleshooting techniques for fluid-power systems
- taking safety precautions
- explaining the modular nature of fluid-power systems
- diagnosing component problems.

Process/Skill Questions:

- What are the methods used to diagnose problems within the fluid-power system?
- How are leaks detected in a pneumatic or hydraulic system?
- What are the typical problems encountered when troubleshooting a fluid-power system?