Title: Write programs to control robots.
Course: Industrial Robotics Technology (21009) > Section: Using and Programming Robotic Equipment

Writing should include

- using open-source and proprietary languages
- describing basic programming commands
- explaining the functions of the commands
- practicing computer language commands
- compiling and executing the program.

Process/Skill Questions:

- What is the function of a loop command?
- What is the function of a subroutine?