Title: Interpret schematics, technical drawings, and flowcharts.
Course: Industrial Robotics Technology (21009) > Section: Understanding Graphic Communication in Robotics

Interpretation should include

- reading and verifying the symbols and legends used in schematics, technical drawings, and flowcharts
- applying the interpretation of a flowchart to write a computer program
- applying the interpretation of technical drawings to build or assemble a product or circuit
- following electrical schematics to breadboard a circuit
- converting schematic into a printed circuit board (PCB) layout.

Process/Skill Questions:

- What does the term schematic mean?
- When might technicians need to read flowcharts, technical drawings, or schematics?