Title: Describe the need for oxygen system inspection.
Course: Aircraft Pilot Training II (20053-II) > Section: Understanding Aircraft Systems

Description should include the concept that oxygen systems, either as part of an aircraft system or supplemental oxygen bottles, have specified inspection and service instructions as part of the aircraft POH.

PLT327

Process/Skill Questions:

- Why are oxygen system inspections critical?