Title: Identify the material properties, storage, and handling requirements of copper tube
Course: Plumbing I (17058-I) > Section: Working with Copper Tube and Fittings

Identification should include

- material properties
- storage requirements (i.e., must be kept dry and secured)
- handling precautions (e.g., wearing gloves).

Process/Skill Questions:

- Why must medical pipe be wrapped and stored separately?
- Why is it important to understand the material qualities of copper?
- What pipe needs to be wrapped and stored separately?
- What is the benefit of keeping piping fittings stored correctly?