Title: Describe a circuit as a system.
Course: Electronics Systems I (17106-18) > Section: Introducing the Structure of Electricity

Description should include identifying

- open, closed, and short circuits
- the fundamental components of a circuit (voltage source, switch, load, conductors).
- voltage source as input; conductors and controllers as process; and load as output.

Process/Skill Questions:

- What are the characteristics of a system?
- What are the characteristics of a short circuit?
- What are the characteristics of an open circuit?
- What are the characteristics of a normal operating circuit?
- What might cause a short circuit?
- Why are switches used?