Title: Replace a start or a run capacitor.
Course: Heating, Ventilation, Air Conditioning, and Refrigeration II (17056-II) > Section: Understanding Motors and Controls

Replacement should include using an ohmmeter and ammeter on run capacitors to check the voltage and amperage.

Process/Skill Questions:

- What is the capacitance rating?
- What is the physical difference between a start and a run capacitor?
- What causes a capacitor to short out?